/// <reference types="../types/electron" />

<template>
  <div>
    <NuxtLayout>
      <NuxtPage />
    </NuxtLayout>
  </div>
</template>

<script setup lang="ts">
// Main app component - handles global layout rendering
</script>

<style>
.app-container {
  height: 100vh;
  width: 100vw;
  overflow: hidden;
  display: flex;
  flex-direction: column;
}
</style>
